0 100 200 300 400 500 600 700 800 900 1000 -40 -20 0 20 40 60 80 ω_{est}

0 200 400 600 800 1000 -1

0

1

2

3

4 ϑ_{sys}

0 200 400 600 800 1000 -1

0

1

2

3

4 ϑ_{est} ω_{ref} ≈ ω_{sys} ϑ_0 = 0 ϑ_0 = π/6 ϑ_0 = π/3 ϑ_0 = π/2 ϑ_0 = 2π/3 ϑ_0 = 5π/6