LIBRARY libfixedpoint.dll
EXPORTS
CreateFixedPointLicenseName
FatPt_ConvertFat2FatRad
FatPt_ConvertFat2FatRad_Prime
_FixPt_ReportDivisionByZero=FixPt_ReportDivisionByZero
_FixPt_ReportOverflow=FixPt_ReportOverflow
_FixPt_ReportSaturation=FixPt_ReportSaturation
_FixPt_RtwValidate=FixPt_RtwValidate
_NotYet_Assertion=NotYet_Assertion
_NotYet_ConversionIsExpressionFriendly=NotYet_ConversionIsExpressionFriendly
_NotYet_ParameterGetFixExp=NotYet_ParameterGetFixExp
_NotYet_ParameterNeedsSingleProp=NotYet_ParameterNeedsSingleProp
_NotYet_ParameterPropBestPrecision=NotYet_ParameterPropBestPrecision
_displayFxpDTP=displayFxpDTP
_dtaDataTypeIdIsFixPt=dtaDataTypeIdIsFixPt
_fhpBestPrecisionQuantizeParts=fhpBestPrecisionQuantizeParts
_fhpConvertFat2Thin=fhpConvertFat2Thin
_fhpConvertThin2Fat=fhpConvertThin2Fat
_fhpDataTypePropComplete=fhpDataTypePropComplete
_fhpDataTypePropExtractPrimary=fhpDataTypePropExtractPrimary
_fhpDtpZeroRwv2DblRwv=fhpDtpZeroRwv2DblRwv
_fhpDtpZeroRwv2Oversized=fhpDtpZeroRwv2Oversized
_fhpDtpZeroRwv2UnionAll=fhpDtpZeroRwv2UnionAll
_fhpFsoConvertFat2FatRad=fhpFsoConvertFat2FatRad
_fhpFsoDivide=fhpFsoDivide
_fhpFsoMultiply=fhpFsoMultiply
_fhpFsoMultiplyComplex_LogMinMax=fhpFsoMultiplyComplex_LogMinMax
_fhpFsoUnaryMinus=fhpFsoUnaryMinus
_fhpGetBuiltinDataTypeProperties=fhpGetBuiltinDataTypeProperties
_fhpReformatFat2Thin=fhpReformatFat2Thin
_fhpReformatThin2Fat=fhpReformatThin2Fat
_fxpAbs=fxpAbs
_fxpAccumNeg=fxpAccumNeg
_fxpAccumNegCollapse=fxpAccumNegCollapse
_fxpAccumPos=fxpAccumPos
_fxpAccumPosCollapse=fxpAccumPosCollapse
_fxpAndCollapse=fxpAndCollapse
_fxpAndEqual=fxpAndEqual
_fxpArrayProp_GetDtSize=fxpArrayProp_GetDtSize
_fxpArrayProp_Set_MxArray=fxpArrayProp_Set_MxArray
_fxpArrayProp_Set_MxArray_wPortDT=fxpArrayProp_Set_MxArray_wPortDT
_fxpArrayProp_Set_Port=fxpArrayProp_Set_Port
_fxpArrayProp_Set_Scalar=fxpArrayProp_Set_Scalar
_fxpBestPrecisionExponent=fxpBestPrecisionExponent
_fxpBitwiseAndCollapse=fxpBitwiseAndCollapse
_fxpBitwiseAndEqual=fxpBitwiseAndEqual
_fxpBitwiseComplement=fxpBitwiseComplement
_fxpBitwiseNandCollapse=fxpBitwiseNandCollapse
_fxpBitwiseNorCollapse=fxpBitwiseNorCollapse
_fxpBitwiseOrCollapse=fxpBitwiseOrCollapse
_fxpBitwiseOrEqual=fxpBitwiseOrEqual
_fxpBitwiseXorCollapse=fxpBitwiseXorCollapse
_fxpBitwiseXorEqual=fxpBitwiseXorEqual
_fxpBlockProp_SetDtaPath=fxpBlockProp_SetDtaPath
_fxpBlockProp_SetMex=fxpBlockProp_SetMex
_fxpBlockProp_SetSFun=fxpBlockProp_SetSFun
_fxpCheckAllPortsUnconnected=fxpCheckAllPortsUnconnected
_fxpCleanBoolean=fxpCleanBoolean
_fxpCompare=fxpCompare
_fxpComplement=fxpComplement
_fxpConj=fxpConj
_fxpConvert=fxpConvert
_fxpConvert_Thin2Bool=fxpConvert_Thin2Bool
_fxpDataTypeAdjustForDTOver=fxpDataTypeAdjustForDTOver
_fxpDataTypeAdjustForDblOver=fxpDataTypeAdjustForDblOver
_fxpDataTypeComplexCheck=fxpDataTypeComplexCheck
_fxpDataTypeForRunTimeParam=fxpDataTypeForRunTimeParam
_fxpDataTypeIdIsFixPt=fxpDataTypeIdIsFixPt
_fxpDataTypeIdSupported=fxpDataTypeIdSupported
_fxpDataTypeNameCreate=fxpDataTypeNameCreate
_fxpDataTypePropCompleteSelf=fxpDataTypePropCompleteSelf
_fxpDataTypePropMulRule=fxpDataTypePropMulRule
_fxpDataTypePropMulRuleWithNoBoolOptim=fxpDataTypePropMulRuleWithNoBoolOptim
_fxpDataTypeProp_GetSize=fxpDataTypeProp_GetSize
_fxpDataTypeProp_IsBuiltIn=fxpDataTypeProp_IsBuiltIn
_fxpDataTypeRegister=fxpDataTypeRegister
_fxpDataTypeRegisterFull=fxpDataTypeRegisterFull
_fxpDataTypeRegisterFullWithCheck=fxpDataTypeRegisterFullWithCheck
_fxpDataTypeRegisterNominalScaling=fxpDataTypeRegisterNominalScaling
_fxpDataTypeRegisterNominalScalingWithCheck=fxpDataTypeRegisterNominalScalingWithCheck
_fxpDataTypeRegisterWithCheck=fxpDataTypeRegisterWithCheck
_fxpDataTypeRuleApplyDeployHW=fxpDataTypeRuleApplyDeployHW
_fxpDataTypeRuleDiv=fxpDataTypeRuleDiv
_fxpDataTypeRuleFloatPriority=fxpDataTypeRuleFloatPriority
_fxpDataTypeRuleMul=fxpDataTypeRuleMul
_fxpDataTypeRuleRecip=fxpDataTypeRuleRecip
_fxpDataTypeZero2Dbl=fxpDataTypeZero2Dbl
_fxpDeadZone=fxpDeadZone
_fxpDivide=fxpDivide
_fxpDivideCollapse=fxpDivideCollapse
_fxpDotProduct=fxpDotProduct
_fxpError=fxpError
_fxpErrorArgs=fxpErrorArgs
_fxpFrameConvert=fxpFrameConvert
_fxpGetBlockPropertiesDefault=fxpGetBlockPropertiesDefault
_fxpGetDataTypePropNoBias=fxpGetDataTypePropNoBias
_fxpGetDataTypePropNoBiasOrFrac=fxpGetDataTypePropNoBiasOrFrac
_fxpGetDataTypePropNoFrac=fxpGetDataTypePropNoFrac
_fxpGetDataTypePropNoScaling=fxpGetDataTypePropNoScaling
_fxpGetDataTypeProperties=fxpGetDataTypeProperties
_fxpGetDataTypePropertiesDefault=fxpGetDataTypePropertiesDefault
_fxpGreaterPositiveRange=fxpGreaterPositiveRange
_fxpGreaterPositiveRangeDtp=fxpGreaterPositiveRangeDtp
_fxpHardwareMaxBits=fxpHardwareMaxBits
_fxpInstrumentLogSaveNamed=fxpInstrumentLogSaveNamed
_fxpInstrumentLogSaveOut=fxpInstrumentLogSaveOut
_fxpLogStateflow=fxpLogStateflow
_fxpLogStruct_Init=fxpLogStruct_Init
_fxpLogStruct_SetLogDataType=fxpLogStruct_SetLogDataType
_fxpLogUpdateMinMax_InBlockProps=fxpLogUpdateMinMax_InBlockProps
_fxpLook1DAbove=fxpLook1DAbove
_fxpLook1DBelow=fxpLook1DBelow
_fxpLook1DInterp=fxpLook1DInterp
_fxpLook1DInterpExtrap=fxpLook1DInterpExtrap
_fxpLook1DNearest=fxpLook1DNearest
_fxpLook2DAbove=fxpLook2DAbove
_fxpLook2DBelow=fxpLook2DBelow
_fxpLook2DInterp=fxpLook2DInterp
_fxpLook2DInterpExtrap=fxpLook2DInterpExtrap
_fxpLook2DNearest=fxpLook2DNearest
_fxpLookUpBreakPointsCheckMono=fxpLookUpBreakPointsCheckMono
_fxpMagSquared=fxpMagSquared
_fxpMaxCollapse=fxpMaxCollapse
_fxpMaxRefine=fxpMaxRefine
_fxpMdlInitSizesCommonPrep=fxpMdlInitSizesCommonPrep
_fxpMinCollapse=fxpMinCollapse
_fxpMinRefine=fxpMinRefine
_fxpMultiply=fxpMultiply
_fxpMultiplyAccum=fxpMultiplyAccum
_fxpMultiplyCollapse=fxpMultiplyCollapse
_fxpMultiplyIsExpressionFriendly=fxpMultiplyIsExpressionFriendly
_fxpMultiplyMatrix=fxpMultiplyMatrix
_fxpMultiplyMatrixAccum=fxpMultiplyMatrixAccum
_fxpNamedParameterCastMxArray=fxpNamedParameterCastMxArray
_fxpNandCollapse=fxpNandCollapse
_fxpNorCollapse=fxpNorCollapse
_fxpOrCollapse=fxpOrCollapse
_fxpOrEqual=fxpOrEqual
_fxpParameterCastMxArray=fxpParameterCastMxArray
_fxpPower2Gain=fxpPower2Gain
_fxpPromoteToDeploymentInt=fxpPromoteToDeploymentInt
_fxpReciprocal=fxpReciprocal
_fxpRemoveTrailingZeros=fxpRemoveTrailingZeros
_fxpRtwWriteObjectValue=fxpRtwWriteObjectValue
_fxpRtwWriteOpChoices=fxpRtwWriteOpChoices
_fxpRtwWritePortDataTypes=fxpRtwWritePortDataTypes
_fxpScAccumNeg=fxpScAccumNeg
_fxpScAccumPos=fxpScAccumPos
_fxpScCompare=fxpScCompare
_fxpScConvert=fxpScConvert
_fxpScConvert_WithErrmsg=fxpScConvert_WithErrmsg
_fxpScEqualsDataTypeMaximum=fxpScEqualsDataTypeMaximum
_fxpScEqualsDataTypeMinimum=fxpScEqualsDataTypeMinimum
_fxpScEqualsJustAboveDataTypeMinimum=fxpScEqualsJustAboveDataTypeMinimum
_fxpScGetRealWorldValue=fxpScGetRealWorldValue
_fxpScGetStoredIntegerValue=fxpScGetStoredIntegerValue
_fxpScLogUpdateMinMax=fxpScLogUpdateMinMax
_fxpScNamedParameterCast=fxpScNamedParameterCast
_fxpScParameterCast=fxpScParameterCast
_fxpScQuantize=fxpScQuantize
_fxpScValueIsZero=fxpScValueIsZero
_fxpSelectRadixDataType=fxpSelectRadixDataType
_fxpSelectRadixDataTypeAllow=fxpSelectRadixDataTypeAllow
_fxpSelectRadixDataTypeMax=fxpSelectRadixDataTypeMax
_fxpSelectRelopDataType=fxpSelectRelopDataType
_fxpSetError=fxpSetError
_fxpSetWarning=fxpSetWarning
_fxpSfnDataTypeId_IsSupported=fxpSfnDataTypeId_IsSupported
_fxpSfnParamCheckDataTypeSpec=fxpSfnParamCheckDataTypeSpec
_fxpSfnParamCheckString=fxpSfnParamCheckString
_fxpSfnParamCheckVector=fxpSfnParamCheckVector
_fxpSlopeNormalize=fxpSlopeNormalize
_fxpSumNegCollapse=fxpSumNegCollapse
_fxpSumPosCollapse=fxpSumPosCollapse
_fxpUnaryMinus=fxpUnaryMinus
_fxpWarning=fxpWarning
_fxpWeightedSum=fxpWeightedSum
_fxpXorCollapse=fxpXorCollapse
_fxpXorEqual=fxpXorEqual
_fxp_CRUDE_AccumNeg=fxp_CRUDE_AccumNeg
_fxp_CRUDE_AccumPos=fxp_CRUDE_AccumPos
_fxp_CRUDE_Divide=fxp_CRUDE_Divide
_fxp_CRUDE_LogUpdateMinMax=fxp_CRUDE_LogUpdateMinMax
_fxp_CRUDE_Multiply=fxp_CRUDE_Multiply
_fxp_CRUDE_MultiplyComplex_LogMinMax=fxp_CRUDE_MultiplyComplex_LogMinMax
_fxp_CRUDE_RemoveTrailingZeros=fxp_CRUDE_RemoveTrailingZeros
_fxp_CRUDE_UnaryMinus=fxp_CRUDE_UnaryMinus
_fxp_FATPT_SetMax=fxp_FATPT_SetMax
_fxp_FATPT_SetMin=fxp_FATPT_SetMin
_fxp_FAT_ValueCompareSameDT=fxp_FAT_ValueCompareSameDT
_getPartOfDataTypeStr=getPartOfDataTypeStr
_libfixedpoint_build_date=libfixedpoint_build_date
_libfixedpoint_version=libfixedpoint_version
_ssFxpConvert=ssFxpConvert
_ssFxpConvertFromRealWorldValue=ssFxpConvertFromRealWorldValue
_ssFxpConvertToRealWorldValue=ssFxpConvertToRealWorldValue
_ssGetDataTypeBias=ssGetDataTypeBias
_ssGetDataTypeFixedExponent=ssGetDataTypeFixedExponent
_ssGetDataTypeFracSlope=ssGetDataTypeFracSlope
_ssGetDataTypeFractionLength=ssGetDataTypeFractionLength
_ssGetDataTypeFxpContainWordLen=ssGetDataTypeFxpContainWordLen
_ssGetDataTypeFxpIsSigned=ssGetDataTypeFxpIsSigned
_ssGetDataTypeFxpWordLength=ssGetDataTypeFxpWordLength
_ssGetDataTypeIsFixedPoint=ssGetDataTypeIsFixedPoint
_ssGetDataTypeIsFloatingPoint=ssGetDataTypeIsFloatingPoint
_ssGetDataTypeIsFxpFltApiCompat=ssGetDataTypeIsFxpFltApiCompat
_ssGetDataTypeIsScalingPow2=ssGetDataTypeIsScalingPow2
_ssGetDataTypeIsScalingTrivial=ssGetDataTypeIsScalingTrivial
_ssGetDataTypeStorageContainCat=ssGetDataTypeStorageContainCat
_ssGetDataTypeStorageContainerSize=ssGetDataTypeStorageContainerSize
_ssGetDataTypeTotalSlope=ssGetDataTypeTotalSlope
_ssRegisterDataTypeFxpBinaryPoint=ssRegisterDataTypeFxpBinaryPoint
_ssRegisterDataTypeFxpFSlopeFixExpBias=ssRegisterDataTypeFxpFSlopeFixExpBias
_ssRegisterDataTypeFxpScaledDouble=ssRegisterDataTypeFxpScaledDouble
_ssRegisterDataTypeFxpSlopeBias=ssRegisterDataTypeFxpSlopeBias
