LIBRARY libfixedpoint.dll
EXPORTS
CreateFixedPointLicenseName
FatPt_ConvertFat2FatRad
FatPt_ConvertFat2FatRad_Prime
FixPt_ReportDivisionByZero
FixPt_ReportOverflow
FixPt_ReportSaturation
FixPt_RtwValidate
NotYet_Assertion
NotYet_ConversionIsExpressionFriendly
NotYet_ParameterGetFixExp
NotYet_ParameterNeedsSingleProp
NotYet_ParameterPropBestPrecision
displayFxpDTP
dtaDataTypeIdIsFixPt
fhpBestPrecisionQuantizeParts
fhpConvertFat2Thin
fhpConvertThin2Fat
fhpDataTypePropComplete
fhpDataTypePropExtractPrimary
fhpDtpZeroRwv2DblRwv
fhpDtpZeroRwv2Oversized
fhpDtpZeroRwv2UnionAll
fhpFsoConvertFat2FatRad
fhpFsoDivide
fhpFsoMultiply
fhpFsoMultiplyComplex_LogMinMax
fhpFsoUnaryMinus
fhpGetBuiltinDataTypeProperties
fhpReformatFat2Thin
fhpReformatThin2Fat
fxpAbs
fxpAccumNeg
fxpAccumNegCollapse
fxpAccumPos
fxpAccumPosCollapse
fxpAndCollapse
fxpAndEqual
fxpArrayProp_GetDtSize
fxpArrayProp_Set_MxArray
fxpArrayProp_Set_MxArray_wPortDT
fxpArrayProp_Set_Port
fxpArrayProp_Set_Scalar
fxpBestPrecisionExponent
fxpBitwiseAndCollapse
fxpBitwiseAndEqual
fxpBitwiseComplement
fxpBitwiseNandCollapse
fxpBitwiseNorCollapse
fxpBitwiseOrCollapse
fxpBitwiseOrEqual
fxpBitwiseXorCollapse
fxpBitwiseXorEqual
fxpBlockProp_SetDtaPath
fxpBlockProp_SetMex
fxpBlockProp_SetSFun
fxpCheckAllPortsUnconnected
fxpCleanBoolean
fxpCompare
fxpComplement
fxpConj
fxpConvert
fxpConvert_Thin2Bool
fxpDataTypeAdjustForDTOver
fxpDataTypeAdjustForDblOver
fxpDataTypeComplexCheck
fxpDataTypeForRunTimeParam
fxpDataTypeIdIsFixPt
fxpDataTypeIdSupported
fxpDataTypeNameCreate
fxpDataTypePropCompleteSelf
fxpDataTypePropMulRule
fxpDataTypePropMulRuleWithNoBoolOptim
fxpDataTypeProp_GetSize
fxpDataTypeProp_IsBuiltIn
fxpDataTypeRegister
fxpDataTypeRegisterFull
fxpDataTypeRegisterFullWithCheck
fxpDataTypeRegisterNominalScaling
fxpDataTypeRegisterNominalScalingWithCheck
fxpDataTypeRegisterWithCheck
fxpDataTypeRuleApplyDeployHW
fxpDataTypeRuleDiv
fxpDataTypeRuleFloatPriority
fxpDataTypeRuleMul
fxpDataTypeRuleRecip
fxpDataTypeZero2Dbl
fxpDeadZone
fxpDivide
fxpDivideCollapse
fxpDotProduct
fxpError
fxpErrorArgs
fxpFrameConvert
fxpGetBlockPropertiesDefault
fxpGetDataTypePropNoBias
fxpGetDataTypePropNoBiasOrFrac
fxpGetDataTypePropNoFrac
fxpGetDataTypePropNoScaling
fxpGetDataTypeProperties
fxpGetDataTypePropertiesDefault
fxpGreaterPositiveRange
fxpGreaterPositiveRangeDtp
fxpHardwareMaxBits
fxpInstrumentLogSaveNamed
fxpInstrumentLogSaveOut
fxpLogStateflow
fxpLogStruct_Init
fxpLogStruct_SetLogDataType
fxpLogUpdateMinMax_InBlockProps
fxpLook1DAbove
fxpLook1DBelow
fxpLook1DInterp
fxpLook1DInterpExtrap
fxpLook1DNearest
fxpLook2DAbove
fxpLook2DBelow
fxpLook2DInterp
fxpLook2DInterpExtrap
fxpLook2DNearest
fxpLookUpBreakPointsCheckMono
fxpMagSquared
fxpMaxCollapse
fxpMaxRefine
fxpMdlInitSizesCommonPrep
fxpMinCollapse
fxpMinRefine
fxpMultiply
fxpMultiplyAccum
fxpMultiplyCollapse
fxpMultiplyIsExpressionFriendly
fxpMultiplyMatrix
fxpMultiplyMatrixAccum
fxpNamedParameterCastMxArray
fxpNandCollapse
fxpNorCollapse
fxpOrCollapse
fxpOrEqual
fxpParameterCastMxArray
fxpPower2Gain
fxpPromoteToDeploymentInt
fxpReciprocal
fxpRemoveTrailingZeros
fxpRtwWriteObjectValue
fxpRtwWriteOpChoices
fxpRtwWritePortDataTypes
fxpScAccumNeg
fxpScAccumPos
fxpScCompare
fxpScConvert
fxpScConvert_WithErrmsg
fxpScEqualsDataTypeMaximum
fxpScEqualsDataTypeMinimum
fxpScEqualsJustAboveDataTypeMinimum
fxpScGetRealWorldValue
fxpScGetStoredIntegerValue
fxpScLogUpdateMinMax
fxpScNamedParameterCast
fxpScParameterCast
fxpScQuantize
fxpScValueIsZero
fxpSelectRadixDataType
fxpSelectRadixDataTypeAllow
fxpSelectRadixDataTypeMax
fxpSelectRelopDataType
fxpSetError
fxpSetWarning
fxpSfnDataTypeId_IsSupported
fxpSfnParamCheckDataTypeSpec
fxpSfnParamCheckString
fxpSfnParamCheckVector
fxpSlopeNormalize
fxpSumNegCollapse
fxpSumPosCollapse
fxpUnaryMinus
fxpWarning
fxpWeightedSum
fxpXorCollapse
fxpXorEqual
fxp_CRUDE_AccumNeg
fxp_CRUDE_AccumPos
fxp_CRUDE_Divide
fxp_CRUDE_LogUpdateMinMax
fxp_CRUDE_Multiply
fxp_CRUDE_MultiplyComplex_LogMinMax
fxp_CRUDE_RemoveTrailingZeros
fxp_CRUDE_UnaryMinus
fxp_FATPT_SetMax
fxp_FATPT_SetMin
fxp_FAT_ValueCompareSameDT
getPartOfDataTypeStr
libfixedpoint_build_date
libfixedpoint_version
ssFxpConvert
ssFxpConvertFromRealWorldValue
ssFxpConvertToRealWorldValue
ssGetDataTypeBias
ssGetDataTypeFixedExponent
ssGetDataTypeFracSlope
ssGetDataTypeFractionLength
ssGetDataTypeFxpContainWordLen
ssGetDataTypeFxpIsSigned
ssGetDataTypeFxpWordLength
ssGetDataTypeIsFixedPoint
ssGetDataTypeIsFloatingPoint
ssGetDataTypeIsFxpFltApiCompat
ssGetDataTypeIsScalingPow2
ssGetDataTypeIsScalingTrivial
ssGetDataTypeStorageContainCat
ssGetDataTypeStorageContainerSize
ssGetDataTypeTotalSlope
ssRegisterDataTypeFxpBinaryPoint
ssRegisterDataTypeFxpFSlopeFixExpBias
ssRegisterDataTypeFxpScaledDouble
ssRegisterDataTypeFxpSlopeBias
